Rani Sungudi Jari Veldhari R102/1

Product code:::R102

Product name:::Jari Veldhari

Blouse:::Separate

Length::: 5.50 meters

Breadth::: 47 inches

Quality ::: 120's Superior

Material ::: 100% cotton

Brand ::: RANI 1948

Design:::Veldhari

Border :::D/S Zari Border

Colour :::Biscuit with brown

Wash ::: Normal

Note ::: If Color may be differ in every digital display